20285—7

North

>

True

Frecent alluviurn end tailings

u

Q

TIPE

q

G/8C/8/

Beorock outcrop

Geoleg/cal houndary

i

4Yyydreulre prt

ja NS C

Plol Ss |e

S\ SI

SS Q

Ser, *rervill

Scs/e or feet

1000 s fo} 10090 2000 Contour /nterva/l 40 feet

Geological Survey, Canada.

Figure 13. Canadian creek, Cariboo district.