froor 1s fine rey sandstone

Coal great! crushed ee shckensided /2".

8"Coaly shale

Coa/, crushed end slaty 8"

2” Shale

Coal Us’ 4 "Coaly shele fs

7 “Shale Coal 4"

/0"Shele

Coal, impure 22"

Coal, 000 1"

Coal and bone 6" 4 Crushed coaly shale

2Q’Brown slick. shale

a cal, crushed FG"

Tota! 3'03%4" Total coal 5334" jn 6 seams

Scale of inches Qo 1/0 /, 20 es

Geological Survey, Canada

Figure 19. Camp Anthracite, section through coal seams.