A NICE TROPHY 207

they were fairly long in the beam, with seven points on each side. Perhaps they were a long way from being record ones, and nothing much to brag about; in fact, I have killed a number of stags with far better ones ;

but never one whose final downfall gave me greater satisfaction. :