i)

PRYER DATA SHERT (CONT'D)

Oo ete

OPERATING TIME

Dryer Number

Hours/Nay

1970 1970 1973

Summer Winter

Summer

1973 Winter

1974

Summer

1974 Winter

Hours/Week 1970

Hours/Year

1970 1973 1973 1974 1974

1970 1970 1973 1973 1974 1974

Summer Winter

Summer

Winter

Summer

Winter

Summer Winter Summer Winter Summer

Winter

aintenance eo sera

inoveiiven

1h0 pea ran aintenance none eee Ae [imac | zene | oano | aane stalled 2800 en ee [3600 3000 na [ao =o a ae aintena 000

2300