In Memoriam

ROBERT BALDWIN DALE-HARRIS 1913 - 1982

Chairman, Brinco Limited 1979-1982

Bob Dale-Harris died suddenly at his home on December 18, 1982. His zest for life, his determination to overcome difficulties and his leadership will long be remembered by all at Brinco.