Management ae | Operating a ed

GENERAL OFFICERS

Chairman of the Board - - - President and General Manager - Vice-President a tee ec Secretary-Treasurer - - -— - Assistant to the General Manager Consulting Engineer - - - - Assistant Secretary-Treasurer - - Chief Accountant = RU. SEHR «

OPERATING DIVISION — Cassiar, B.C.

General Superintendent - - = - Mine — Superintendent - -— - Assistant Superintendent - Equipment Superintendent Mill — Superintendent - - Assistant Superintendent - Plant — Superintendent - - - Mechanical Superintendent Electrical Superintendent - Surface Superintendent - Chief Engineer - - - - - Chief Geologist - - - - - Office and Warehouse — Office Manager - - - - - Accountant - - - - Purchasing - - - -

TRANSPORT DIVISION — Whitehorse, Y.T.

General Superintendent - - - Maintenance Superintendent - - Accountant) t=). t=" =a see =

VANCOUVER OPERATIONS

Office Manager - - - - - Superintendent — West Indies Wharf

Pace Two

F. M. CONNELL, O.B.E., J. D. CHRISTIAN, C.B.E., W. HAROLD CONNELL

CR ELON, CA.

N. GRITZUK, B.Sc.

Tatts TIGERTs BIA.Se:

J. R. SCRIMGER

M. G. MAZURKEWICH

J. G. BERRY, B.Sc.

T., 0: HORSEEY,~ BA-Se: J. R. MURDOCH, B.Sc. G. EDWARDS

A. C. BEGUIN, B.A.Sc. D. ae B.Sc.

Cc. BRONSON, B.Sc. R. sae

A. POWELL

Cc

A.

W.

C. CARON N. PLUMB, B.A.Sc.

W. L. JOHNSON J. THORNICROFT R. R. STEVENS

E. K. McARTHUR W. G. WHITEHOUSE R. HILL

J. T. WARD

Cassiar Asbestos Corporation Limited

LED: B.A.Sc.

S. M. MANNING, B.A.Sc.