PART II (Cont'd)

(c) Tailings to Dump:

_ Base Year Projected

Net Tons/Year (51), ) 823,267 - 1,011 ,089 1,088 ,788

% Of Free Asbestos Fibre Retained On F15) 40 Mesh In Tailings

(d) Shipping:

Base Year Projected 1970 1974

Net Tons Shipped in Bulk

Net Tons Shipped in Bags

(a) Pressure Pack

(b) Valve Type 3 Bags

(B) Operation Information and Dust Collector Data

Operation Information an¢ Dust “——————————

1) For each Dryer, please complete the attached Dryer Data Sheet.

2) For each Dust Collector * please assign a number and complete, the attached Dust Collector Data Sheet.

y% Include all dust collectors (including drill collectors) that condition air before it is released to atmosphere.