CASSIAR ASBESTOS CORPORATION LTD.

SUPERVISORY STAFF

General Superintendent __............--.----. sea et J. G. Berry Ass’t. Gen. Superintendent —..----------- C. E. Bronson Mine Superintendent _____.......-..--.....----------...----- T. L. Horsley Ass’t. Mine Superintendent ___-------.-------.--- J. R. Murdoch Mill’Superintendent.—...= 2 > ee A. C. Beguin Ass’t. Mill Superintendent ___-_.__-----_-_.---------------- D. C. Cook Chiet Engineer) ae ee A. C. Carson Chief Geologist: 5 = = s2<. 2a eee W.N. Plumb Medical Superintendent _______-__.. __------------_-- Dr. P. R. Didcott Equipment Garage Superintendent _.....______-______. G. Edwards Office Manager. 2.0. ee W. L. Johnson Ghief Accountant = eS J. H. Thornicroft Mechanical Superintendent ____.......------..-.----__.. R. A. Pasiaud Electrical Superintendent ___..............---------------.. A. P. Powell Surface Superintendent ________...-_.-----------------------------.---- C. Hood

Personnel and Safety Supervisor_____.............. A. G,. C. Church