V A N C 0 U V E R Crown Wi if Upper Campbell L Misiiatens, ZS Li ‘|

ISLAND FORBES LANDING 9 “XN \ iN 2 AN : “XN Comox 4.14 ° Sj om > OURTENAY g NY chMox iy 2 a) ip) a (UNION BAY &

7exada Island

\Quaticum BEAC

ALBER ie Arrows” M39 Xia

ay

JORDAN RIVER POWER DEV. 24,000 H.P.

PORT ANGELES

Nineteen