Massett-Graham Island

(Near Prince Rupert, British Columbia)

Coal Company

MAIN OFFICE BOARD OF TRADE BUILDING PORTLAND, OREGON

AUTHORIZED CAPITAL. $5,000,000 All Common Stock

Par Value of Shares $1.00 Each, Fully Paid and Non- Assessable

Treasury Stock, 2,500,000 Shares

BOARD OF DIRECTORS

R. L. DURHAME, Vice-President, Merchants’ National Bank, Portland, Ore.

pe MIBERILE, Clicago, Ill. -:

W.- fH. HUREBURT; Portland, Ore.

A. B. CRrossMAN, Portland, Ore.

Dr.. Homer I. KEENEY, Portland, Ore. S. ANDREW HARTMAN, Portland, Ore. F. C. Merars, Portland, Ore.

©). PF. MERRIEL, Chicago, Hl.

GEORGE L. CouRTNEY, Victoria, B. G HERBERT CUTHBERT, Victoria, B. C.

OFFICERS ee el ee ke. President (Retired Banker and Capitalist) BANGS. 22 bo ees Vice-President

(Formerly Cashier Lumbermen’s National Bank)

mG. CROSSMAN.........Secretary and Treasurer

(Formerly Postmaster of Portland)