214

Moosebar Creek Section (H 1—H 2 )—Continued

Shalendarksomewhatpissil ep ey renee rr errr eter Ener Ee Coal) Superionjseamieene ete che ae eee ee oe Sandstone, argillaceous, in thick beds (1 foot to 2 feet), surfaces of

some) beds ripple-mankedun us aeee eee n ernie Sandstone, fine, argillaceous, thin bedded..............0.00eeeeeee Shale, arenaceous, somewhat fissile...........00200.ccceeeeeece eee CoalisB 5 nacre sulin ne ine tate aU Try abe ELIS nun a eae me pee aE INN, CEO NINE, HEI. coyacoonsassondusundabonccdacosoonoue. Shale, shaly 3-inch clay ironstone band near base..............+++.

Shale, carbonaceous, fissile Sandstone, medium grain, massive............ceecsseeeeeeecsuees Sandstone shine eet ayy cece ee era Se aa ree Shale, arenaceous, 3-inch clay ironstone band at top.............--- Shale, carbonaceous, fissile

Coal

_ SRP SCOOP ONWOCOCORWOOR NE ROCCONWWOONICOCONE

=

CROPREP NN OCHRE ROH HONNI OUMNH ONONOW

Feet Inches

= APOSOWWDARSCOMNWAROOAGCM DOOCWWWHOUIWNHROAMNURDO Cw

m =

a

WAMOMWDOWWMDODADNDOMROOMRORODRDS