4590

| i FOSTER SHAFT | SAID TO BE S6FT. ' DEEP

1

! U i

= Oe

aeons pe Pe =

OREGON GULCH

—_—_——_—

GULCH

i I i ali I 1 | { | | 1 \ | | | l

(a) < eo)

POETS OREGON

SECTION ALONG A-8B LOOKING NORTH

PR ae ee SS sae eee ; ees

LEGEND

—_—_ VEIN

nnn «S FAULT

---47y

* OPEN CUT

Sa eee

9IF SAMPLE LOCATION

4490

: ie} 40 80 120 i SCALE ene cen ££ ET 4480

CONTOUR INTERVAL IO FEET

i.

4470 EL.4500FT. ASSUMED FOR DUMP OF ADIT.

FOSTER LEDGE CAMP MILE

Fig. 6. Foster Ledge Gold Mines, Limited—showing surface and underground workings at upper adit.

52