CANADA DEPARTMENT OF MINES

GEOLOGICAL SURVEY BRANCH.

Hon. W. B. NanteL, Minister; A. P. Low, DEPUTY MINISTER; R. W. Brock, Director.

(REPRINT.)

REPORT

ON

GRAHAM ISLAND

BRITISH COLUMBIA

- BY

R. W. ELLS

OTTAWA GOVERNMENT PRINTING BUREAU.

1912.

16 No. 940.