180

Bore-hele No. 2. Put down about 14 miles west of No. 1 on border of slough on lot 10, about one-eighth mile from high- water mark. Depth of hole, 1,075 feet. Diamond drill used ( ?).

This vertical hole passed through seven lignite seams, of which two are 2 feet and 4 feet thick respectively, also sixteen beds of clay, averaging 34 feet thick.